Président du Conseil international de MSF

7 et 8 juin 1990

Réunion intersections de MSF

• Décision d’avoir une présidence tournante du Conseil de MSF Europe entre les sections.

• MSF Belgique est désignée pour assurer la présidence de MSF Europe jusqu’à la fin de l’année.

2 juillet 1990

Réunion du Conseil européen de MSF

Approbation de la déclaration d’intention de MSF Belgique pour la création de MSF Europe.

15 novembre 1990

Réunion du Conseil international de MSF

Accord sur les termes de référence du Président du Conseil international :

• Nommé pour une période de six mois.

• Droit et devoir d’initiative, avec possibilité de déléguer.

• Porte-parole de MSF International.

• Devoir de maintenir la cohésion entre les sections (visites dans les sections).

• Doit se donner les moyens de sa gestion, ce qui lui confère une certaine autonomie.

• Rôle de coordination et de dynamisation, ce qui implique une grande disponibilité.

Février 1991 - Janvier 1992

Rony Brauman, Président de MSF France, est Président du Conseil international (CI) de MSF.

Janvier 1992 - Août 1992

Reginald Moreels, Président de MSF Belgique, est Président du CI de MSF.

26 juin 1992

Réunion du Conseil international de MSF

Décision de renforcer le rôle du Président du CI et du Secrétaire général de MSF International dans la mise en place des décisions prises par le CI à Melun.

Août 1992 - Février 1994

Rony Brauman, Président de MSF France, est Président du CI de MSF.

Février 1994 - Février 1995

Jacques De Milliano, Directeur général de MSF Hollande, est Président du CI de MSF.

Février 1995 - Juin 1996

Doris Schopper, Présidente de MSF Suisse, est Présidente du CI de MSF.

20-21 juin 1996

Réunion du Conseil international de MSF

Le Président du CI et le Secrétaire général de MSF International sont chargés d’organiser des groupes de travail et de faire des propositions sur :

• La structure de MSF

• Les règles du mouvement MSF

• Le rôle du Conseil international.

Juin 1996 - Septembre 1997

Philippe Biberson, Président de MSF France, est Président du CI de MSF.

Septembre 1996

Lettre du Président du CI et du Secrétaire général de MSF International CI proposant de renforcer l’aspect international de MSF en réorganisant la structure du CI.

31 janvier 1997

Réunion du Conseil international de MSF avec des représentants des 19 entités MSF :

• CI élargi à 19 entités avec un droit de vote égal.

• Création d’un Conseil restreint composé des présidents de six à huit sections [dont les sections opérationnelles] et du Président du CI.

• Création du poste de Président du CI qui :

o Est élu pour deux ans à la majorité des 2/3 des membres du CI ;

o Est rémunéré ;

o Est chargé de représenter le mouvement et de favoriser le développement international de MSF ;

o A le droit et le devoir de prendre des initiatives dans le cadre du mandat du CI et du Conseil restreint.

Septembre 1997 - Juin 1998

Comme aucun membre du CI n’est candidat pour assurer la présidence internationale pendant deux ans, Doris Schopper, la Présidente de MSF Suisse, est élue Présidente de MSF international. Elle est chargée d’identifier des candidats à la présidence.

Les qualifications requises sont :

• Docteur en médecine

• Quatre années d’expérience avec MSF

• Bilingue français et anglais

• Disponible au moins trois jours par semaine.

Janvier 1998

Réunion du Conseil international de MSF

Définition du rôle du Président du CI et de la procédure de nomination

Juin 1998

Réunion du Conseil international de MSF

James Orbinski est élu Président du Conseil international. Odysséas Boudouris, Président de MSF Grèce et Morten Rostrup, Président de MSF Norvège, sont élus Vice-présidents.

10 décembre 1999

James Orbinski, Président du CI de MSF, prononce le discours d’acceptation du prix Nobel de la paix lors de la cérémonie à Oslo.

10 juin 2000

Réunion du Conseil international de MSF

Motion décidant que le Président du CI doit être choisi parmi ses membres.

Morton Rostrup est élu Président du Conseil international, il prendra ses fonctions en décembre 2000.

26 septembre 2002

Document de discussion de Morton Rostrup, Président du CI sur « MSF et sa croissance malsaine ».

Novembre 2002

Morton Rostrup démissionne de son poste de Président de MSF Norvège pour consacrer plus de temps à ses activités de Président du CI.

21-23 novembre 2003

Réunion du Conseil international de MSF

Rowan Gillies est élu Président du CI, il prendra ses fonctions début 2004.

25-27 juin 2004

Réunion du Conseil international de MSF

Rowan Gillies propose sa démission suite à son sentiment d’impuissance à réduire les tensions dans le mouvement. Le CI refuse sa démission et s’engage à intensifier son soutien.

Juin 2005

« Qu’est-ce que le processus de La Mancha » : Mémo de Rowan Gillies, Président du CI.

24-26 juin 2005

Réunion du Conseil international de MSF

Vote d’une résolution stipulant que « Le Président du Conseil international doit être de profession médicale ou paramédicale et être un membre élu du Conseil d’administration d’une section de MSF ».

22 octobre 2005

Réunion du Conseil d’administration du Conseil international de MSF

Le mandat du Président du CI doit être d’au moins trois ans.

Septembre 2005

Mémo de Rowan Gillies sur le rôle du Président du CI.

11 mars 2006

Réunion du Conseil international de MSF

Rowan Gillies insiste sur l’élection d’un Vice-président qui partage la charge de travail avec le Président du CI.

Juillet 2006

Christophe Fournier est élu Président du Conseil international, il prendra ses fonctions en décembre 2006.

2-3 décembre 2006

Réunion du Conseil international de MSF

Adoption du profil de poste du Vice-président du CI.

23-24 juin 2007

Réunion du Conseil international de MSF

Anneli Eriksson est élue Vice-présidente du CI, elle travaillera à mi-temps et sera en charge de certains dossiers.

9 décembre 2009

Réunion du Conseil international de MSF

Unni Karunakara est élu Président du CI, il prendra ses fonctions en juin 2010.

28 juin 2013

Assemblée générale internationale de MSF

Joanne Liu est élue Présidente internationale.